-- 输送线仿真判定堵塞超时时间，单位毫秒
-- 默认 10000ms，与现有硬编码行为保持一致

INSERT INTO sys_config(name, code, value, type, status, select_type)
SELECT '输送线仿真判定堵塞超时时间(毫秒)', 'fakeRunBlockTimeoutMs', '10000', 1, 1, 'fake'
FROM dual
WHERE NOT EXISTS (
    SELECT 1
    FROM sys_config
    WHERE code = 'fakeRunBlockTimeoutMs'
);

SELECT id, name, code, value, type, status, select_type
FROM sys_config
WHERE code = 'fakeRunBlockTimeoutMs';
