ALTER TABLE [dbo].[man_order_detl_log] ADD [finger_melting_min] decimal(10) NULL
    GO

ALTER TABLE [dbo].[man_order_detl_log] ADD [finger_melting_max] decimal(10) NULL
    GO

ALTER TABLE [dbo].[man_order_detl_log] ADD [fusing_point_min] decimal(10) NULL
    GO

ALTER TABLE [dbo].[man_order_detl_log] ADD [fusing_point_max] decimal(10) NULL
    GO

ALTER TABLE [dbo].[man_order_detl_log] ADD [yellowness_min] decimal(10) NULL
    GO

ALTER TABLE [dbo].[man_order_detl_log] ADD [yellowness_max] decimal(10) NULL
    GO

ALTER TABLE [dbo].[man_order_detl_log] ADD [opacity_min] decimal(10) NULL
    GO

ALTER TABLE [dbo].[man_order_detl_log] ADD [opacity_max] decimal(10) NULL