-- 入库通知单等界面展示：exceStatus=2 显示为「待入库」（库内仍为 2，与 AsnExceStatus.ASN_EXCE_STATUS_RECEIPT_DONE 一致）
UPDATE `sys_dict_data`
SET `label` = '待入库',
    `update_time` = NOW()
WHERE `dict_type_code` = 'sys_asn_exce_status'
  AND `value` = '2'
  AND (`deleted` = 0 OR `deleted` IS NULL);
