-- RCS AGV 异常上报入站审计（http-audit.whitelist-only=true 时需命中规则才写 sys_http_audit_log）
SET NAMES utf8mb4;

INSERT INTO `sys_http_audit_rule` (
  `rule_type`, `match_mode`, `pattern`, `direction`,
  `request_max_chars`, `response_max_chars`, `enabled`, `record_all`, `sort_order`, `remark`, `deleted`
) VALUES (
  'URI', 'PREFIX', '/rcs/api/open/agvError', 'IN',
  -1, -1, 1, 0, 100, 'RCS POST /rcs/api/open/agvError', 0
);
